Title: A2.1 Getting ready
Course: FPA_Have you tried turning it off and on again? (IC)

In this unit, you will take part in a dialogue at a computer store.

In order to get familiar with some key words, fill in the gaps with the following words:

battery

camera

hard drive

LAN

optical drive
ports

processor

RAM

screen

slot

1. Intel Core 2 Duo _____________ at 2GHz

2. 2GB DDR2 SD_____________

3. 200GB _____________

4. DVD+/-RW _____________

5. 17” WXGA high-definition LCD _____________

6. Memory Stick _____________

7. Three USB 2.0 _____________

8. Integrated wireless _____________

9. Built-in 'Motion Eye' digital _____________

10. Lithium-ion _____________

Then, take a look at the following computers specifications and find two specs for each feature.

Windows 8 | 1 TB +
500 GB | 4GB and less
Windows 7 | 8GB +
3rd Gen Intel Core i7 - Intel Celeron | Desktop (H39.9 x W11.4 x D35.3)
All-In-One | CD/DVD+RW
No Monitor | Intel Pentium Dual Core
Blu-Ray Disc | 56 cm (22”) or bigger
Integrated | Dedicated Graphics – 1 GB

Processor

Operating System

Memory

Hard Drive Size

Tower Size

Graphics

Desktop Monitor Size

Optical Drive