Title: A3.2 Getting the gist – While-watching task I
Course: FPA_Have you tried turning it off and on again? (IC)

Now watch the scene and complete Moss' e-mail. In this scene Moss sets the office on fire after leaving a soldering iron switched on, and e-mails the fire brigade for help since he can't remember their new number (0118 999 881 999 119 7253).

 | E2 Calamity Jen – Fire Scene

Subject: (1) ________

“Dear Sir stroke Madam, I am (2) ________ to inform you of a fire which has broken out at the premises of..." no, that's too formal.[deletes text, starts again] "Dear Sir stroke Madam. Fire, exclamation mark. Fire, exclamation mark. (3) ________ me, exclamation mark. 123 Carrendon (4) ________. Looking (5) ________ to hearing from you. All the (6) ________, Maurice Moss."