Title: A3.1 Getting ready – Before-watching task I
Course: FPA_Have you tried turning it off and on again? (IC)

This time you are going to watch a scene from the second episode of the acclaimed British TV series The IT Crowd (2006-2010), which is set in the London offices of the fictional Reynholm Industries and revolves around the three staff members of its IT department: a geeky genius named Maurice Moss (Ayoade), the workshy Roy Trenneman (O'Dowd), and Jen Barber (Parkinson), the department head, who knows nothing about IT.